-- Modify "InfraGroup" table
ALTER TABLE "public"."InfraGroup" ALTER COLUMN "Code" TYPE character varying(10), ALTER COLUMN "Name" TYPE character varying(50), ADD COLUMN "Level" smallint NULL;
