-- phpMyAdmin SQL Dump
-- version 5.0.2
-- https://www.phpmyadmin.net/
--
-- Host: 127.0.0.1
-- Waktu pembuatan: 01 Okt 2021 pada 05.21
-- Versi server: 10.4.11-MariaDB
-- Versi PHP: 7.4.6

SET SQL_MODE = "NO_AUTO_VALUE_ON_ZERO";
START TRANSACTION;
SET time_zone = "+00:00";


/*!40101 SET @OLD_CHARACTER_SET_CLIENT=@@CHARACTER_SET_CLIENT */;
/*!40101 SET @OLD_CHARACTER_SET_RESULTS=@@CHARACTER_SET_RESULTS */;
/*!40101 SET @OLD_COLLATION_CONNECTION=@@COLLATION_CONNECTION */;
/*!40101 SET NAMES utf8mb4 */;

--
-- Database: `perawatigd`
--

-- --------------------------------------------------------

--
-- Struktur dari tabel `datapasien_ok`
--

CREATE TABLE `datapasien_ok` (
  `id_ok` int(12) NOT NULL,
  `id_pasien` int(11) NOT NULL,
  `register` int(12) NOT NULL,
  `nama` text NOT NULL,
  `ruang` text NOT NULL,
  `ruang_asal` text NOT NULL,
  `jam_daftar` datetime DEFAULT NULL,
  `status_tunggu` text NOT NULL,
  `rencana_tindakan` text NOT NULL,
  `kriteria_tindakan` text NOT NULL,
  `status_keluar` text NOT NULL,
  `jam_keluar` datetime DEFAULT NULL,
  `perawat_ppa` text NOT NULL,
  `waiting` varchar(20) NOT NULL,
  `smf` text NOT NULL,
  `prolong` text NOT NULL,
  `diagnosa_medis` text NOT NULL,
  `operator` text NOT NULL,
  `dpjp_operator` text NOT NULL,
  `anestesi` text NOT NULL,
  `dpjp_anestesi` text NOT NULL,
  `perawat_kajaga_ok` text NOT NULL,
  `perawat_sirkuler` text NOT NULL,
  `perawat_instrumen` text NOT NULL,
  `perawat_anestesi` text NOT NULL,
  `jam_respon` datetime NOT NULL
) ENGINE=InnoDB DEFAULT CHARSET=latin1;

--
-- Indexes for dumped tables
--

--
-- Indeks untuk tabel `datapasien_ok`
--
ALTER TABLE `datapasien_ok`
  ADD PRIMARY KEY (`id_ok`);

--
-- AUTO_INCREMENT untuk tabel yang dibuang
--

--
-- AUTO_INCREMENT untuk tabel `datapasien_ok`
--
ALTER TABLE `datapasien_ok`
  MODIFY `id_ok` int(12) NOT NULL AUTO_INCREMENT;
COMMIT;

/*!40101 SET CHARACTER_SET_CLIENT=@OLD_CHARACTER_SET_CLIENT */;
/*!40101 SET CHARACTER_SET_RESULTS=@OLD_CHARACTER_SET_RESULTS */;
/*!40101 SET COLLATION_CONNECTION=@OLD_COLLATION_CONNECTION */;
